ALTER TABLE omo.consultant DROP COLUMN latest_login_time;

CREATE TABLE omo.login_record (
    id bigserial NOT NULL,
    account varchar NOT NULL,
    login_method varchar NOT NULL,
    login_date timestamp NOT NULL,
    "result" varchar NOT NULL,
    failed_reason varchar NULL,
    CONSTRAINT login_record_pk PRIMARY KEY (id)
);
